\documentclass[12pt,letterpaper,notitlepage]{article}
\usepackage{fullpage}
\begin{document}
\setlength{\pdfpagewidth}{8.5in}
\setlength{\pdfpageheight}{11in}
\input{sec1}
\end{document}